"use client";
// /components/main/kabelueberwachung/kue705FO/Charts/IsoMeasurementChart/IsoChartActionBar.tsx
import React from "react";
import DateRangePicker from "@/components/common/DateRangePicker";
import { useDispatch, useSelector } from "react-redux";
import { RootState } from "@/redux/store";
import {
  setIsoMeasurementCurveChartData,
  setSelectedMode,
  setChartOpen,
  setLoading,
} from "@/redux/slices/kabelueberwachungChartSlice";
import { setBrushRange } from "@/redux/slices/brushSlice";
import { Listbox } from "@headlessui/react";

//-----------------------------------------------------------------------------------useIsoChartLoader
export const useIsoChartLoader = () => {
  const dispatch = useDispatch();
  const { vonDatum, bisDatum, selectedMode, slotNumber } = useSelector(
    (state: RootState) => state.kabelueberwachungChartSlice
  );
  const hasShownNoDataAlert = React.useRef(false);

  const formatDate = (dateString: string) => {
    const [year, month, day] = dateString.split("-");
    return `${year};${month};${day}`;
  };

  const getApiUrl = (mode: "DIA0" | "DIA1" | "DIA2", slotNumber: number) => {
    const type = 3; // Fest auf Isolationswiderstand gesetzt
    const typeFolder = "isolationswiderstand";

    let url: string;

    if (process.env.NODE_ENV === "development") {
      url = `/api/cpl/slotDataAPIHandler?slot=${slotNumber}&messart=${typeFolder}&dia=${mode}&vonDatum=${vonDatum}&bisDatum=${bisDatum}`;
    } else {
      url = `${window.location.origin}/CPL?seite.ACP&${mode}=${formatDate(
        vonDatum
      )};${formatDate(bisDatum)};${slotNumber};${type};`;
    }

    console.log("API URL:", url);
    return url;
  };

  const loadIsoChartData = async () => {
    if (slotNumber === null) return;

    dispatch(setLoading(true));
    dispatch(setChartOpen(false));
    dispatch(setIsoMeasurementCurveChartData([]));

    const startTime = Date.now();
    const MIN_LOADING_TIME_MS = 1000;

    try {
      const apiUrl = getApiUrl(selectedMode, slotNumber);
      const response = await fetch(apiUrl);
      const data = await response.json();

      const waitTime = Math.max(
        0,
        MIN_LOADING_TIME_MS - (Date.now() - startTime)
      );
      await new Promise((res) => setTimeout(res, waitTime));

      if (Array.isArray(data) && data.length > 0) {
        dispatch(setIsoMeasurementCurveChartData(data));
        dispatch(setChartOpen(true));
      } else {
        dispatch(setIsoMeasurementCurveChartData([]));
        dispatch(setChartOpen(false));
        if (!hasShownNoDataAlert.current) {
          alert("⚠️ Keine Messdaten im gewählten Zeitraum gefunden");
          hasShownNoDataAlert.current = true;
        }
      }
    } catch (err) {
      console.error("❌ Fehler beim Laden:", err);
      alert("❌ Fehler beim Laden.");
    } finally {
      dispatch(setLoading(false));
    }
  };

  return { loadIsoChartData };
};

//-----------------------------------------------------------------------------------useIsoDataLoader Hook
export const useIsoDataLoader = () => {
  const dispatch = useDispatch();
  const { vonDatum, bisDatum, selectedMode, slotNumber } = useSelector(
    (state: RootState) => state.kabelueberwachungChartSlice
  );

  const formatDate = (dateString: string) => {
    const [year, month, day] = dateString.split("-");
    return `${year};${month};${day}`;
  };

  const getApiUrl = (mode: "DIA0" | "DIA1" | "DIA2", slotNumber: number) => {
    const type = 3; // Fest auf Isolationswiderstand gesetzt
    const typeFolder = "isolationswiderstand";

    const baseUrl =
      process.env.NODE_ENV === "development"
        ? `/api/cpl/slotDataAPIHandler?slot=${slotNumber}&messart=${typeFolder}&dia=${mode}&vonDatum=${vonDatum}&bisDatum=${bisDatum}`
        : `${window.location.origin}/CPL?seite.ACP&${mode}=${formatDate(
            vonDatum
          )};${formatDate(bisDatum)};${slotNumber};${type};`;

    return baseUrl;
  };

  const loadData = async () => {
    if (slotNumber === null) {
      console.log("⚠️ Kein Slot ausgewählt - automatisches Laden übersprungen");
      return;
    }

    const apiUrl = getApiUrl(selectedMode, slotNumber);
    if (!apiUrl) return;

    dispatch(setLoading(true));
    dispatch(setChartOpen(false));
    dispatch(setIsoMeasurementCurveChartData([]));

    const MIN_LOADING_TIME_MS = 1000;
    const startTime = Date.now();

    try {
      const response = await fetch(apiUrl, {
        method: "GET",
        headers: { "Content-Type": "application/json" },
      });

      if (!response.ok) throw new Error(`Fehler: ${response.status}`);

      const jsonData = await response.json();
      const elapsedTime = Date.now() - startTime;
      const waitTime = Math.max(0, MIN_LOADING_TIME_MS - elapsedTime);
      await new Promise((resolve) => setTimeout(resolve, waitTime));

      console.log("▶️ Automatisches Laden - Isolationswiderstand-Daten für:");
      console.log("  Slot:", slotNumber);
      console.log("  Modus:", selectedMode);
      console.log("  Von:", vonDatum);
      console.log("  Bis:", bisDatum);

      if (Array.isArray(jsonData) && jsonData.length > 0) {
        dispatch(setIsoMeasurementCurveChartData(jsonData));
        dispatch(setChartOpen(true));
      } else {
        console.log(
          "⚠️ Keine Messdaten im gewählten Zeitraum gefunden (automatisches Laden)"
        );
        dispatch(setIsoMeasurementCurveChartData([]));
        dispatch(setChartOpen(false));
      }
    } catch (err) {
      console.error("❌ Fehler beim automatischen Laden der Daten:", err);
    } finally {
      dispatch(setLoading(false));
    }
  };

  return { loadData };
};

//-----------------------------------------------------------------------------------IsoChartActionBar
const IsoChartActionBar: React.FC = () => {
  const dispatch = useDispatch();

  const { vonDatum, bisDatum, selectedMode, slotNumber, chartTitle } =
    useSelector((state: RootState) => state.kabelueberwachungChartSlice);

  const formatDate = (dateString: string) => {
    const [year, month, day] = dateString.split("-");
    return `${year};${month};${day}`;
  };

  const getApiUrl = (mode: "DIA0" | "DIA1" | "DIA2", slotNumber: number) => {
    const type = 3; // Fest auf Isolationswiderstand gesetzt
    const typeFolder = "isolationswiderstand";

    const baseUrl =
      process.env.NODE_ENV === "development"
        ? `/api/cpl/slotDataAPIHandler?slot=${slotNumber}&messart=${typeFolder}&dia=${mode}&vonDatum=${vonDatum}&bisDatum=${bisDatum}`
        : `${window.location.origin}/CPL?seite.ACP&${mode}=${formatDate(
            vonDatum
          )};${formatDate(bisDatum)};${slotNumber};${type};`;

    console.log("baseUrl", baseUrl);
    return baseUrl;
  };

  const handleFetchData = async () => {
    if (slotNumber === null) {
      alert("⚠️ Bitte zuerst einen KÜ auswählen!");
      return;
    }

    const apiUrl = getApiUrl(selectedMode, slotNumber);
    if (!apiUrl) return;

    dispatch(setLoading(true));
    dispatch(setChartOpen(false));
    dispatch(setIsoMeasurementCurveChartData([]));

    const MIN_LOADING_TIME_MS = 1000;
    const startTime = Date.now();

    try {
      const response = await fetch(apiUrl, {
        method: "GET",
        headers: { "Content-Type": "application/json" },
      });

      if (!response.ok) throw new Error(`Fehler: ${response.status}`);

      const jsonData = await response.json();
      const elapsedTime = Date.now() - startTime;
      const waitTime = Math.max(0, MIN_LOADING_TIME_MS - elapsedTime);
      await new Promise((resolve) => setTimeout(resolve, waitTime));

      console.log("▶️ Lade Isolationswiderstand-Daten für:");
      console.log("  Slot:", slotNumber);
      console.log("  Modus:", selectedMode);
      console.log("  Von:", vonDatum);
      console.log("  Bis:", bisDatum);
      console.log("  URL:", apiUrl);
      console.log("  Daten:", jsonData);

      if (Array.isArray(jsonData) && jsonData.length > 0) {
        dispatch(setIsoMeasurementCurveChartData(jsonData));
        dispatch(setChartOpen(true));
      } else {
        alert("⚠️ Keine Messdaten im gewählten Zeitraum gefunden.");
        dispatch(setIsoMeasurementCurveChartData([]));
        dispatch(setChartOpen(false));
      }
    } catch (err) {
      console.error("❌ Fehler beim Laden der Daten:", err);
      alert("❌ Fehler beim Laden der Daten.");
    } finally {
      dispatch(setLoading(false));
    }
  };

  return (
    <div className="flex justify-between items-center p-2 bg-gray-100 rounded-lg space-x-2">
      <div className="flex items-center">
        <label className="text-sm font-semibold">
          KÜ {slotNumber !== null ? slotNumber + 1 : "-"}
        </label>
      </div>

      <div className="flex items-center space-x-2">
        {/* DateRangePicker - Platz reservieren, aber ausblenden wenn Meldungen */}
        <div
          style={{
            visibility: chartTitle === "Messkurve" ? "visible" : "hidden",
          }}
        >
          <DateRangePicker />
        </div>

        {/* DIA0-DIA2 Dropdown - Platz reservieren, aber ausblenden wenn Meldungen */}
        <div
          style={{
            visibility: chartTitle === "Messkurve" ? "visible" : "hidden",
          }}
        >
          <Listbox
            value={selectedMode}
            onChange={(value) => {
              dispatch(setSelectedMode(value));
              dispatch(setBrushRange({ startIndex: 0, endIndex: 0 }));
            }}
          >
            <div className="relative w-48">
              <Listbox.Button className="w-full border px-3 py-1 rounded text-left bg-white flex justify-between items-center text-sm">
                <span>
                  {
                    {
                      DIA0: "Alle Messwerte",
                      DIA1: "Stündliche Werte",
                      DIA2: "Tägliche Werte",
                    }[selectedMode]
                  }
                </span>
                <svg
                  className="w-5 h-5 text-gray-400"
                  viewBox="0 0 20 20"
                  fill="currentColor"
                >
                  <path
                    fillRule="evenodd"
                    d="M5.23 7.21a.75.75 0 011.06.02L10 10.585l3.71-3.355a.75.75 0 111.02 1.1l-4.25 3.85a.75.75 0 01-1.02 0l-4.25-3.85a.75.75 0 01.02-1.06z"
                    clipRule="evenodd"
                  />
                </svg>
              </Listbox.Button>
              <Listbox.Options className="absolute z-50 mt-1 w-full border rounded bg-white shadow max-h-60 overflow-auto text-sm">
                {["DIA0", "DIA1", "DIA2"].map((mode) => (
                  <Listbox.Option
                    key={mode}
                    value={mode}
                    className={({ selected, active }) =>
                      `px-4 py-1 cursor-pointer ${
                        selected
                          ? "bg-littwin-blue text-white"
                          : active
                          ? "bg-gray-200"
                          : ""
                      }`
                    }
                  >
                    {
                      {
                        DIA0: "Alle Messwerte",
                        DIA1: "Stündliche Werte",
                        DIA2: "Tägliche Werte",
                      }[mode]
                    }
                  </Listbox.Option>
                ))}
              </Listbox.Options>
            </div>
          </Listbox>
        </div>

        {/* Dropdown für Auswahl zwischen "Messkurve" und "Meldungen" - immer anzeigen */}
        {/* Dropdown für Auswahl zwischen "Messkurve" und "Meldungen" entfernt */}

        {/* Daten laden Button - Platz reservieren, aber ausblenden wenn Meldungen */}
        <div
          style={{
            visibility: chartTitle === "Messkurve" ? "visible" : "hidden",
          }}
        >
          <button
            onClick={handleFetchData}
            className="px-4 py-1 bg-littwin-blue text-white rounded text-sm"
          >
            Daten laden
          </button>
        </div>
      </div>
    </div>
  );
};

export default IsoChartActionBar;
