"use client";
import React, { useState } from "react";
import Kue705FO from "../../components/modules/Kue705FO";

function Kabelueberwachung() {
  const moduleValues = {
    isolationswert: ">200",
    schleifenwiderstand: "0.85",
  };

  return (
    <div className="bg-gray-100 flex-1 p-4">
      <h1 className="text-2xl mb-4">Kabelüberwachung</h1>
      <div className="flex flex-row gap-4">
        {/* Hier verwenden wir die Kue705FO-Komponente */}
        <Kue705FO
          isolationswert={moduleValues.isolationswert}
          schleifenwiderstand={moduleValues.schleifenwiderstand}
        />
        <Kue705FO isolationswert="150" schleifenwiderstand="1.00" />
        <Kue705FO isolationswert="150" schleifenwiderstand="1.00" />
        <Kue705FO isolationswert="150" schleifenwiderstand="1.00" />
        <Kue705FO
          isolationswert={moduleValues.isolationswert}
          schleifenwiderstand={moduleValues.schleifenwiderstand}
        />
        <Kue705FO isolationswert="150" schleifenwiderstand="1.00" />
        <Kue705FO isolationswert="150" schleifenwiderstand="1.00" />
        <Kue705FO isolationswert="150" schleifenwiderstand="1.00" />
      </div>
    </div>
  );
}

export default Kabelueberwachung;
